prompt --application/pages/page_00915
begin
--   Manifest
--     PAGE: 00915
--   Manifest End
wwv_flow_api.component_begin (
 p_version_yyyy_mm_dd=>'2021.04.15'
,p_release=>'21.1.7'
,p_default_workspace_id=>9014660246496943
,p_default_application_id=>770
,p_default_id_offset=>0
,p_default_owner=>'CORE'
);
wwv_flow_api.create_page(
 p_id=>915
,p_user_interface_id=>wwv_flow_api.id(9169746885570061)
,p_name=>'#fa-user-secret Sessions'
,p_alias=>'SESSIONS'
,p_step_title=>'Sessions'
,p_autocomplete_on_off=>'OFF'
,p_group_id=>wwv_flow_api.id(9240371448352386)
,p_page_template_options=>'#DEFAULT#'
,p_required_role=>wwv_flow_api.id(9823062898204869)
,p_last_updated_by=>'DEV'
,p_last_upd_yyyymmddhh24miss=>'20220206122140'
);
wwv_flow_api.create_page_plug(
 p_id=>wwv_flow_api.id(20856814673868425)
,p_plug_name=>'Pages Requests & Performance'
,p_icon_css_classes=>'fa-dial-gauge-chart'
,p_region_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_api.id(9070356145569920)
,p_plug_display_sequence=>40
,p_include_in_reg_disp_sel_yn=>'Y'
,p_plug_display_point=>'BODY'
,p_plug_query_options=>'DERIVED_REPORT_COLUMNS'
,p_attribute_01=>'N'
,p_attribute_02=>'HTML'
);
wwv_flow_api.create_page_plug(
 p_id=>wwv_flow_api.id(20856996595868426)
,p_plug_name=>'Pages Requests & Performance [CHART]'
,p_region_template_options=>'#DEFAULT#:t-Region--removeHeader js-removeLandmark:t-Region--scrollBody'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_api.id(9080157814569926)
,p_plug_display_sequence=>50
,p_include_in_reg_disp_sel_yn=>'Y'
,p_plug_display_point=>'BODY'
,p_query_type=>'TABLE'
,p_query_table=>'SESSIONS_PAGES'
,p_query_order_by=>'PAGE_ID'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_JET_CHART'
,p_plug_query_num_rows=>15
,p_plug_query_options=>'DERIVED_REPORT_COLUMNS'
);
wwv_flow_api.create_jet_chart(
 p_id=>wwv_flow_api.id(20857031409868427)
,p_region_id=>wwv_flow_api.id(20856996595868426)
,p_chart_type=>'bar'
,p_height=>'400'
,p_animation_on_display=>'none'
,p_animation_on_data_change=>'none'
,p_orientation=>'vertical'
,p_data_cursor=>'auto'
,p_data_cursor_behavior=>'auto'
,p_hide_and_show_behavior=>'withRescale'
,p_hover_behavior=>'dim'
,p_stack=>'on'
,p_stack_label=>'off'
,p_connect_nulls=>'Y'
,p_value_position=>'auto'
,p_fill_multi_series_gaps=>false
,p_zoom_and_scroll=>'off'
,p_tooltip_rendered=>'Y'
,p_show_series_name=>true
,p_show_group_name=>true
,p_show_value=>true
,p_show_label=>true
,p_show_row=>true
,p_show_start=>true
,p_show_end=>true
,p_show_progress=>true
,p_show_baseline=>true
,p_legend_rendered=>'on'
,p_legend_position=>'bottom'
,p_overview_rendered=>'off'
,p_horizontal_grid=>'auto'
,p_vertical_grid=>'auto'
,p_gauge_orientation=>'circular'
,p_gauge_plot_area=>'on'
,p_show_gauge_value=>true
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(20857101790868428)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_seq=>10
,p_name=>'Requests'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'COUNT_REQUESTS'
,p_items_label_column_name=>'PAGE_ID'
,p_items_short_desc_column_name=>'TOOLTIP_REQUESTS'
,p_assigned_to_y2=>'off'
,p_stack_category=>'Requests'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(20857451592868431)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_seq=>20
,p_name=>'Avg Time'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'AVG_TIME'
,p_items_label_column_name=>'PAGE_ID'
,p_items_short_desc_column_name=>'TOOLTIP_AVG_TIME'
,p_assigned_to_y2=>'on'
,p_stack_category=>'Times'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(20857519088868432)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_seq=>30
,p_name=>'Max Time'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'DIFF_TIME'
,p_items_label_column_name=>'PAGE_ID'
,p_items_short_desc_column_name=>'TOOLTIP_MAX_TIME'
,p_assigned_to_y2=>'on'
,p_stack_category=>'Times'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(20858321815868440)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_seq=>40
,p_name=>'Users'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'COUNT_USERS'
,p_items_label_column_name=>'PAGE_ID'
,p_items_short_desc_column_name=>'TOOLTIP_USERS'
,p_assigned_to_y2=>'on'
,p_stack_category=>'Users'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_axis(
 p_id=>wwv_flow_api.id(20857629074868433)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_axis=>'y2'
,p_is_rendered=>'on'
,p_format_type=>'decimal'
,p_decimal_places=>0
,p_format_scaling=>'auto'
,p_scaling=>'linear'
,p_baseline_scaling=>'zero'
,p_position=>'auto'
,p_major_tick_rendered=>'on'
,p_minor_tick_rendered=>'off'
,p_tick_label_rendered=>'on'
,p_split_dual_y=>'auto'
,p_zoom_order_seconds=>false
,p_zoom_order_minutes=>false
,p_zoom_order_hours=>false
,p_zoom_order_days=>false
,p_zoom_order_weeks=>false
,p_zoom_order_months=>false
,p_zoom_order_quarters=>false
,p_zoom_order_years=>false
);
wwv_flow_api.create_jet_chart_axis(
 p_id=>wwv_flow_api.id(20857231052868429)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_axis=>'x'
,p_is_rendered=>'on'
,p_format_scaling=>'auto'
,p_scaling=>'linear'
,p_baseline_scaling=>'zero'
,p_major_tick_rendered=>'on'
,p_minor_tick_rendered=>'off'
,p_tick_label_rendered=>'on'
,p_tick_label_rotation=>'auto'
,p_tick_label_position=>'outside'
,p_zoom_order_seconds=>false
,p_zoom_order_minutes=>false
,p_zoom_order_hours=>false
,p_zoom_order_days=>false
,p_zoom_order_weeks=>false
,p_zoom_order_months=>false
,p_zoom_order_quarters=>false
,p_zoom_order_years=>false
);
wwv_flow_api.create_jet_chart_axis(
 p_id=>wwv_flow_api.id(20857363886868430)
,p_chart_id=>wwv_flow_api.id(20857031409868427)
,p_axis=>'y'
,p_is_rendered=>'on'
,p_format_type=>'decimal'
,p_decimal_places=>0
,p_format_scaling=>'none'
,p_scaling=>'linear'
,p_baseline_scaling=>'zero'
,p_position=>'auto'
,p_major_tick_rendered=>'on'
,p_minor_tick_rendered=>'off'
,p_tick_label_rendered=>'on'
,p_zoom_order_seconds=>false
,p_zoom_order_minutes=>false
,p_zoom_order_hours=>false
,p_zoom_order_days=>false
,p_zoom_order_weeks=>false
,p_zoom_order_months=>false
,p_zoom_order_quarters=>false
,p_zoom_order_years=>false
);
wwv_flow_api.create_page_plug(
 p_id=>wwv_flow_api.id(21138670743787776)
,p_plug_name=>'Sessions'
,p_icon_css_classes=>'fa-user-secret'
,p_region_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_api.id(9070356145569920)
,p_plug_display_sequence=>10
,p_include_in_reg_disp_sel_yn=>'Y'
,p_plug_display_point=>'BODY'
,p_plug_query_options=>'DERIVED_REPORT_COLUMNS'
,p_attribute_01=>'N'
,p_attribute_02=>'HTML'
);
wwv_flow_api.create_page_plug(
 p_id=>wwv_flow_api.id(21487169676596246)
,p_plug_name=>'Sessions [GRID]'
,p_region_name=>'SESSIONS'
,p_region_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_api.id(9078290074569925)
,p_plug_display_sequence=>20
,p_include_in_reg_disp_sel_yn=>'Y'
,p_plug_display_point=>'BODY'
,p_query_type=>'TABLE'
,p_query_table=>'SESSIONS_OVERVIEW'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_IG'
,p_plug_query_options=>'DERIVED_REPORT_COLUMNS'
,p_prn_content_disposition=>'ATTACHMENT'
,p_prn_document_header=>'APEX'
,p_prn_units=>'INCHES'
,p_prn_paper_size=>'LETTER'
,p_prn_width=>11
,p_prn_height=>8.5
,p_prn_orientation=>'HORIZONTAL'
,p_prn_page_header=>'Sessions [GRID]'
,p_prn_page_header_font_color=>'#000000'
,p_prn_page_header_font_family=>'Helvetica'
,p_prn_page_header_font_weight=>'normal'
,p_prn_page_header_font_size=>'12'
,p_prn_page_footer_font_color=>'#000000'
,p_prn_page_footer_font_family=>'Helvetica'
,p_prn_page_footer_font_weight=>'normal'
,p_prn_page_footer_font_size=>'12'
,p_prn_header_bg_color=>'#EEEEEE'
,p_prn_header_font_color=>'#000000'
,p_prn_header_font_family=>'Helvetica'
,p_prn_header_font_weight=>'bold'
,p_prn_header_font_size=>'10'
,p_prn_body_bg_color=>'#FFFFFF'
,p_prn_body_font_color=>'#000000'
,p_prn_body_font_family=>'Helvetica'
,p_prn_body_font_weight=>'normal'
,p_prn_body_font_size=>'10'
,p_prn_border_width=>.5
,p_prn_page_header_alignment=>'CENTER'
,p_prn_page_footer_alignment=>'CENTER'
,p_prn_border_color=>'#666666'
,p_plug_header=>'&P915_FILTERS_SESSIONS!RAW.'
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22116838899769046)
,p_name=>'APP_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'APP_ID'
,p_data_type=>'NUMBER'
,p_is_query_only=>true
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>10
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_is_primary_key=>false
,p_include_in_export=>false
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22116940079769047)
,p_name=>'SESSION_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'SESSION_ID'
,p_data_type=>'NUMBER'
,p_is_query_only=>true
,p_item_type=>'NATIVE_NUMBER_FIELD'
,p_heading=>'Session Id'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>20
,p_value_alignment=>'RIGHT'
,p_attribute_03=>'right'
,p_is_required=>true
,p_link_target=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.:915:P915_SESSION_ID:&SESSION_ID.'
,p_link_text=>'&SESSION_ID.'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117071599769048)
,p_name=>'USER_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'USER_ID'
,p_data_type=>'VARCHAR2'
,p_is_query_only=>true
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>'User Id'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>30
,p_value_alignment=>'LEFT'
,p_attribute_05=>'BOTH'
,p_is_required=>true
,p_max_length=>30
,p_link_target=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.::P915_USER_ID:&USER_ID.'
,p_link_text=>'&USER_ID.'
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117230137769049)
,p_name=>'COUNT_REQUESTS'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'COUNT_REQUESTS'
,p_data_type=>'NUMBER'
,p_is_query_only=>true
,p_item_type=>'NATIVE_NUMBER_FIELD'
,p_heading=>'Requests'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>40
,p_value_alignment=>'RIGHT'
,p_attribute_03=>'right'
,p_is_required=>false
,p_link_target=>'f?p=&APP_ID.:901:&SESSION.::&DEBUG.:901:P901_FLAG,P901_SESSION_ID:P,&SESSION_ID.'
,p_link_text=>'&COUNT_REQUESTS.'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117286286769050)
,p_name=>'COUNT_LOGS'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'COUNT_LOGS'
,p_data_type=>'NUMBER'
,p_is_query_only=>true
,p_item_type=>'NATIVE_NUMBER_FIELD'
,p_heading=>'Logs'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>50
,p_value_alignment=>'RIGHT'
,p_attribute_03=>'right'
,p_is_required=>false
,p_link_target=>'f?p=&APP_ID.:901:&SESSION.::&DEBUG.:901:P901_FLAG,P901_SESSION_ID:,&SESSION_ID.'
,p_link_text=>'&COUNT_LOGS.'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117386227769051)
,p_name=>'COUNT_ERRORS'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'COUNT_ERRORS'
,p_data_type=>'NUMBER'
,p_is_query_only=>true
,p_item_type=>'NATIVE_NUMBER_FIELD'
,p_heading=>'Errors'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>60
,p_value_alignment=>'RIGHT'
,p_attribute_03=>'right'
,p_is_required=>false
,p_link_target=>'f?p=&APP_ID.:901:&SESSION.::&DEBUG.:901:P901_FLAG,P901_SESSION_ID:E,&SESSION_ID.'
,p_link_text=>'&COUNT_ERRORS.'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117517975769052)
,p_name=>'COUNT_EVENTS'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'COUNT_EVENTS'
,p_data_type=>'NUMBER'
,p_is_query_only=>true
,p_item_type=>'NATIVE_NUMBER_FIELD'
,p_heading=>'Events'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>70
,p_value_alignment=>'RIGHT'
,p_attribute_03=>'right'
,p_is_required=>false
,p_link_target=>'f?p=&APP_ID.:940:&SESSION.::&DEBUG.:940::'
,p_link_text=>'&COUNT_EVENTS.'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117597473769053)
,p_name=>'CREATED_AT'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATED_AT'
,p_data_type=>'DATE'
,p_is_query_only=>true
,p_item_type=>'NATIVE_DATE_PICKER_JET'
,p_heading=>'Created At'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>90
,p_value_alignment=>'CENTER'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_format_mask=>'&FORMAT_TIME.'
,p_is_required=>true
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117656636769054)
,p_name=>'UPDATED_AT'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'UPDATED_AT'
,p_data_type=>'DATE'
,p_is_query_only=>true
,p_item_type=>'NATIVE_DATE_PICKER_JET'
,p_heading=>'Updated At'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>100
,p_value_alignment=>'CENTER'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_format_mask=>'&FORMAT_TIME.'
,p_is_required=>true
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117770419769055)
,p_name=>'DURATION'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'DURATION'
,p_data_type=>'VARCHAR2'
,p_is_query_only=>true
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>'Duration'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>80
,p_value_alignment=>'RIGHT'
,p_attribute_05=>'BOTH'
,p_is_required=>false
,p_max_length=>32767
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
);
wwv_flow_api.create_region_column(
 p_id=>wwv_flow_api.id(22117896415769056)
,p_name=>'ACTION_DELETE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'ACTION_DELETE'
,p_data_type=>'VARCHAR2'
,p_is_query_only=>true
,p_item_type=>'NATIVE_HTML_EXPRESSION'
,p_heading=>'Delete'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>110
,p_value_alignment=>'CENTER'
,p_attribute_01=>'&ACTION_DELETE.'
,p_link_target=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.::P915_DELETE:&SESSION_ID.'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_is_primary_key=>false
,p_include_in_export=>true
,p_security_scheme=>wwv_flow_api.id(9556407311505078)
);
wwv_flow_api.create_interactive_grid(
 p_id=>wwv_flow_api.id(22116752420769045)
,p_internal_uid=>22116752420769045
,p_is_editable=>false
,p_lazy_loading=>false
,p_requires_filter=>false
,p_select_first_row=>false
,p_fixed_row_height=>true
,p_pagination_type=>'SET'
,p_show_total_row_count=>true
,p_show_toolbar=>true
,p_toolbar_buttons=>'SEARCH_COLUMN:SEARCH_FIELD:ACTIONS_MENU:SAVE'
,p_enable_save_public_report=>false
,p_enable_subscriptions=>true
,p_enable_flashback=>true
,p_define_chart_view=>true
,p_enable_download=>true
,p_download_formats=>'CSV:HTML:XLSX:PDF'
,p_enable_mail_download=>true
,p_fixed_header=>'PAGE'
,p_show_icon_view=>false
,p_show_detail_view=>false
,p_javascript_code=>wwv_flow_string.join(wwv_flow_t_varchar2(
'function(config) {',
'    return unified_ig_toolbar(config);',
'}',
''))
);
wwv_flow_api.create_ig_report(
 p_id=>wwv_flow_api.id(22142900243551344)
,p_interactive_grid_id=>wwv_flow_api.id(22116752420769045)
,p_static_id=>'102683'
,p_type=>'PRIMARY'
,p_default_view=>'GRID'
,p_rows_per_page=>20
,p_show_row_number=>false
,p_settings_area_expanded=>true
);
wwv_flow_api.create_ig_report_view(
 p_id=>wwv_flow_api.id(22143051252551344)
,p_report_id=>wwv_flow_api.id(22142900243551344)
,p_view_type=>'GRID'
,p_stretch_columns=>true
,p_srv_exclude_null_values=>false
,p_srv_only_display_columns=>true
,p_edit_mode=>false
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22143603456551347)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>1
,p_column_id=>wwv_flow_api.id(22116838899769046)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22144447327551350)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>1
,p_column_id=>wwv_flow_api.id(22116940079769047)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>180
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22145337905551354)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>2
,p_column_id=>wwv_flow_api.id(22117071599769048)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>300
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22146308473551358)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>4
,p_column_id=>wwv_flow_api.id(22117230137769049)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22147170537551360)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>3
,p_column_id=>wwv_flow_api.id(22117286286769050)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22148047038551362)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>5
,p_column_id=>wwv_flow_api.id(22117386227769051)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22149019452551365)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>6
,p_column_id=>wwv_flow_api.id(22117517975769052)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22149929803551367)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>7
,p_column_id=>wwv_flow_api.id(22117597473769053)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22150760835551370)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>8
,p_column_id=>wwv_flow_api.id(22117656636769054)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
,p_sort_order=>1
,p_sort_direction=>'DESC'
,p_sort_nulls=>'FIRST'
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22151664548551372)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>9
,p_column_id=>wwv_flow_api.id(22117770419769055)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_api.create_ig_report_column(
 p_id=>wwv_flow_api.id(22152559513551374)
,p_view_id=>wwv_flow_api.id(22143051252551344)
,p_display_seq=>10
,p_column_id=>wwv_flow_api.id(22117896415769056)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>90
);
wwv_flow_api.create_page_plug(
 p_id=>wwv_flow_api.id(23107011421702357)
,p_plug_name=>'Sessions [CHART]'
,p_region_template_options=>'#DEFAULT#:t-Region--removeHeader js-removeLandmark:t-Region--scrollBody'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_api.id(9080157814569926)
,p_plug_display_sequence=>30
,p_include_in_reg_disp_sel_yn=>'Y'
,p_plug_display_point=>'BODY'
,p_query_type=>'TABLE'
,p_query_table=>'SESSIONS_CHART'
,p_query_order_by=>'CHART_LABEL'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_JET_CHART'
,p_plug_query_num_rows=>15
,p_plug_query_options=>'DERIVED_REPORT_COLUMNS'
);
wwv_flow_api.create_jet_chart(
 p_id=>wwv_flow_api.id(11884191829358759)
,p_region_id=>wwv_flow_api.id(23107011421702357)
,p_chart_type=>'line'
,p_height=>'400'
,p_animation_on_display=>'none'
,p_animation_on_data_change=>'none'
,p_orientation=>'vertical'
,p_data_cursor=>'auto'
,p_data_cursor_behavior=>'auto'
,p_hide_and_show_behavior=>'withRescale'
,p_hover_behavior=>'dim'
,p_stack=>'off'
,p_stack_label=>'off'
,p_connect_nulls=>'Y'
,p_value_position=>'auto'
,p_fill_multi_series_gaps=>false
,p_zoom_and_scroll=>'off'
,p_tooltip_rendered=>'Y'
,p_show_series_name=>true
,p_show_group_name=>true
,p_show_value=>true
,p_show_label=>true
,p_show_row=>true
,p_show_start=>true
,p_show_end=>true
,p_show_progress=>true
,p_show_baseline=>true
,p_legend_rendered=>'on'
,p_legend_position=>'bottom'
,p_overview_rendered=>'off'
,p_horizontal_grid=>'auto'
,p_vertical_grid=>'auto'
,p_gauge_orientation=>'circular'
,p_gauge_plot_area=>'on'
,p_show_gauge_value=>true
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(11886438944358762)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_seq=>10
,p_name=>'Requests'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'COUNT_REQUESTS'
,p_items_label_column_name=>'CHART_LABEL'
,p_line_style=>'solid'
,p_line_type=>'auto'
,p_marker_rendered=>'auto'
,p_marker_shape=>'circle'
,p_assigned_to_y2=>'off'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(13239464881910331)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_seq=>20
,p_name=>'Pages'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'COUNT_PAGES'
,p_items_label_column_name=>'CHART_LABEL'
,p_line_style=>'solid'
,p_line_type=>'auto'
,p_marker_rendered=>'auto'
,p_marker_shape=>'circle'
,p_assigned_to_y2=>'off'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(14219367382378941)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_seq=>30
,p_name=>'Others'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'COUNT_OTHERS'
,p_items_label_column_name=>'CHART_LABEL'
,p_line_style=>'solid'
,p_line_type=>'auto'
,p_marker_rendered=>'auto'
,p_marker_shape=>'circle'
,p_assigned_to_y2=>'off'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_series(
 p_id=>wwv_flow_api.id(11885852966358762)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_seq=>40
,p_name=>'Users'
,p_location=>'REGION_SOURCE'
,p_items_value_column_name=>'COUNT_USERS'
,p_items_label_column_name=>'CHART_LABEL'
,p_line_style=>'solid'
,p_line_type=>'auto'
,p_marker_rendered=>'auto'
,p_marker_shape=>'circle'
,p_assigned_to_y2=>'off'
,p_items_label_rendered=>false
,p_items_label_display_as=>'PERCENT'
,p_threshold_display=>'onIndicator'
);
wwv_flow_api.create_jet_chart_axis(
 p_id=>wwv_flow_api.id(11884682966358760)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_axis=>'x'
,p_is_rendered=>'on'
,p_format_scaling=>'auto'
,p_scaling=>'linear'
,p_baseline_scaling=>'zero'
,p_major_tick_rendered=>'on'
,p_minor_tick_rendered=>'off'
,p_tick_label_rendered=>'on'
,p_tick_label_rotation=>'auto'
,p_tick_label_position=>'outside'
,p_zoom_order_seconds=>false
,p_zoom_order_minutes=>false
,p_zoom_order_hours=>false
,p_zoom_order_days=>false
,p_zoom_order_weeks=>false
,p_zoom_order_months=>false
,p_zoom_order_quarters=>false
,p_zoom_order_years=>false
);
wwv_flow_api.create_jet_chart_axis(
 p_id=>wwv_flow_api.id(11885205198358761)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_axis=>'y'
,p_is_rendered=>'on'
,p_min=>0
,p_format_type=>'decimal'
,p_decimal_places=>0
,p_format_scaling=>'none'
,p_scaling=>'linear'
,p_baseline_scaling=>'zero'
,p_position=>'auto'
,p_major_tick_rendered=>'on'
,p_minor_tick_rendered=>'off'
,p_tick_label_rendered=>'on'
,p_zoom_order_seconds=>false
,p_zoom_order_minutes=>false
,p_zoom_order_hours=>false
,p_zoom_order_days=>false
,p_zoom_order_weeks=>false
,p_zoom_order_months=>false
,p_zoom_order_quarters=>false
,p_zoom_order_years=>false
);
wwv_flow_api.create_jet_chart_axis(
 p_id=>wwv_flow_api.id(21544557729954439)
,p_chart_id=>wwv_flow_api.id(11884191829358759)
,p_axis=>'y2'
,p_is_rendered=>'on'
,p_format_scaling=>'auto'
,p_scaling=>'linear'
,p_baseline_scaling=>'zero'
,p_position=>'auto'
,p_major_tick_rendered=>'on'
,p_minor_tick_rendered=>'off'
,p_tick_label_rendered=>'on'
,p_split_dual_y=>'auto'
,p_zoom_order_seconds=>false
,p_zoom_order_minutes=>false
,p_zoom_order_hours=>false
,p_zoom_order_days=>false
,p_zoom_order_weeks=>false
,p_zoom_order_months=>false
,p_zoom_order_quarters=>false
,p_zoom_order_years=>false
);
wwv_flow_api.create_page_button(
 p_id=>wwv_flow_api.id(11875275965358741)
,p_button_sequence=>30
,p_button_plug_id=>wwv_flow_api.id(21138670743787776)
,p_button_name=>'TODAY_LEFT'
,p_button_action=>'REDIRECT_PAGE'
,p_button_template_options=>'#DEFAULT#'
,p_button_template_id=>wwv_flow_api.id(9144574670569995)
,p_button_image_alt=>'Previous Day'
,p_button_position=>'BODY'
,p_button_redirect_url=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.::G_TODAY:&G_YESTERDAY.'
,p_icon_css_classes=>'fa-arrow-left'
,p_grid_new_row=>'N'
,p_grid_new_column=>'Y'
);
wwv_flow_api.create_page_button(
 p_id=>wwv_flow_api.id(11875613174358741)
,p_button_sequence=>40
,p_button_plug_id=>wwv_flow_api.id(21138670743787776)
,p_button_name=>'TODAY_RIGHT'
,p_button_action=>'REDIRECT_PAGE'
,p_button_template_options=>'#DEFAULT#'
,p_button_template_id=>wwv_flow_api.id(9144574670569995)
,p_button_image_alt=>'Next Day'
,p_button_position=>'BODY'
,p_button_redirect_url=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.::G_TODAY:&G_TOMORROW.'
,p_icon_css_classes=>'fa-arrow-right'
,p_grid_new_row=>'N'
,p_grid_new_column=>'N'
);
wwv_flow_api.create_page_button(
 p_id=>wwv_flow_api.id(11876037636358741)
,p_button_sequence=>50
,p_button_plug_id=>wwv_flow_api.id(21138670743787776)
,p_button_name=>'TODAY_SET'
,p_button_action=>'REDIRECT_PAGE'
,p_button_template_options=>'#DEFAULT#'
,p_button_template_id=>wwv_flow_api.id(9144574670569995)
,p_button_image_alt=>'Set Current Date'
,p_button_position=>'BODY'
,p_button_redirect_url=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.::G_TODAY:'
,p_button_condition=>':G_TODAY != app.get_date()'
,p_button_condition2=>'PLSQL'
,p_button_condition_type=>'EXPRESSION'
,p_icon_css_classes=>'fa-calendar-o'
,p_grid_new_row=>'N'
,p_grid_new_column=>'N'
);
wwv_flow_api.create_page_button(
 p_id=>wwv_flow_api.id(11876480184358742)
,p_button_sequence=>10
,p_button_plug_id=>wwv_flow_api.id(21138670743787776)
,p_button_name=>'REFRESH'
,p_button_action=>'REDIRECT_PAGE'
,p_button_template_options=>'#DEFAULT#'
,p_button_template_id=>wwv_flow_api.id(9144574670569995)
,p_button_image_alt=>'Refresh'
,p_button_position=>'RIGHT_OF_TITLE'
,p_button_redirect_url=>'f?p=&APP_ID.:915:&SESSION.::&DEBUG.:915::'
,p_icon_css_classes=>'fa-refresh'
);
wwv_flow_api.create_page_button(
 p_id=>wwv_flow_api.id(14219848308378946)
,p_button_sequence=>20
,p_button_plug_id=>wwv_flow_api.id(21138670743787776)
,p_button_name=>'SHOW_USER'
,p_button_action=>'REDIRECT_PAGE'
,p_button_template_options=>'#DEFAULT#'
,p_button_template_id=>wwv_flow_api.id(9144574670569995)
,p_button_is_hot=>'Y'
,p_button_image_alt=>'Show User'
,p_button_position=>'RIGHT_OF_TITLE'
,p_button_redirect_url=>'f?p=&APP_ID.:920:&SESSION.::&DEBUG.:920:P920_USER_ID:&P915_USER_ID.'
,p_button_condition=>'P915_USER_ID'
,p_button_condition_type=>'ITEM_IS_NOT_NULL'
,p_icon_css_classes=>'fa-user'
);
wwv_flow_api.create_page_item(
 p_id=>wwv_flow_api.id(11876860900358743)
,p_name=>'P915_DELETE'
,p_item_sequence=>50
,p_item_plug_id=>wwv_flow_api.id(21138670743787776)
,p_use_cache_before_default=>'NO'
,p_display_as=>'NATIVE_HIDDEN'
,p_attribute_01=>'Y'
);
wwv_flow_api.create_page_item(
 p_id=>wwv_flow_api.id(11877255275358744)
,p_name=>'P915_SESSION_ID'
,p_item_sequence=>60
,p_item_plug_id=>wwv_flow_api.id(21138670743787776)
,p_display_as=>'NATIVE_HIDDEN'
,p_attribute_01=>'Y'
);
wwv_flow_api.create_page_item(
 p_id=>wwv_flow_api.id(11877666096358744)
,p_name=>'P915_USER_ID'
,p_item_sequence=>70
,p_item_plug_id=>wwv_flow_api.id(21138670743787776)
,p_display_as=>'NATIVE_HIDDEN'
,p_attribute_01=>'Y'
);
wwv_flow_api.create_page_item(
 p_id=>wwv_flow_api.id(11878097155358744)
,p_name=>'P915_TODAY'
,p_item_sequence=>10
,p_item_plug_id=>wwv_flow_api.id(21138670743787776)
,p_use_cache_before_default=>'NO'
,p_prompt=>'&G_TODAY_LABEL.'
,p_format_mask=>'&FORMAT_DATE.'
,p_source=>'G_TODAY'
,p_source_type=>'ITEM'
,p_display_as=>'NATIVE_DATE_PICKER_JET'
,p_cSize=>30
,p_colspan=>3
,p_field_template=>wwv_flow_api.id(9142775823569991)
,p_item_template_options=>'#DEFAULT#'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
);
wwv_flow_api.create_page_item(
 p_id=>wwv_flow_api.id(23306255403761018)
,p_name=>'P915_FILTERS_SESSIONS'
,p_item_sequence=>80
,p_item_plug_id=>wwv_flow_api.id(21138670743787776)
,p_display_as=>'NATIVE_HIDDEN'
,p_attribute_01=>'Y'
);
wwv_flow_api.create_page_da_event(
 p_id=>wwv_flow_api.id(11887446838358764)
,p_name=>'TODAY_CHANGED'
,p_event_sequence=>10
,p_triggering_element_type=>'ITEM'
,p_triggering_element=>'P915_TODAY'
,p_bind_type=>'bind'
,p_bind_event_type=>'change'
);
wwv_flow_api.create_page_da_action(
 p_id=>wwv_flow_api.id(11887933014358765)
,p_event_id=>wwv_flow_api.id(11887446838358764)
,p_event_result=>'TRUE'
,p_action_sequence=>10
,p_execute_on_page_init=>'N'
,p_action=>'NATIVE_SUBMIT_PAGE'
,p_attribute_02=>'Y'
);
wwv_flow_api.create_page_process(
 p_id=>wwv_flow_api.id(11887034079358763)
,p_process_sequence=>10
,p_process_point=>'BEFORE_HEADER'
,p_process_type=>'NATIVE_PLSQL'
,p_process_name=>'ACTION_DELETE_SESSION'
,p_process_sql_clob=>wwv_flow_string.join(wwv_flow_t_varchar2(
'app.log_action(''DELETE_SESSION'', app.get_item(''$DELETE''));',
'--',
'app.delete_session (',
'    in_session_id   => app.get_item(''$DELETE'')',
');',
''))
,p_process_clob_language=>'PLSQL'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_process_when=>'P915_DELETE'
,p_process_when_type=>'ITEM_IS_NOT_NULL'
);
wwv_flow_api.component_end;
end;
/
